Copyright: Thursday, October 07, 1999 10:32:24


Displays rights currently granted to this user account.  User rights grant specific privileges and logon rights to users and groups in your computing environment.


Displays the privileges currently granted to this user account User rights grant specific privileges and logon rights to users and groups in your computing environment.


Click to add another privilege to this user account.


Click to remove the selected privilege from this user account.


Specifies whether to include this security setting in your Group Policy object or security template.


Displays the list of accounts currently in this group.


Displays the list of accounts currently in this group.


Click to add an account to this group.


Click to remove an account from this group.


Displays the list of groups of which this group is a member.


Displays the list of groups of which this group is a member.


Click to make this group a member of another group.


Click to remove this group from another group’s membership.


Displays the current system security value of this attribute used during security analysis.


Displays the value to which you want to change this attribute. The change will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Displays the current system security value of this attribute that is used during security analysis.


Displays the value to which you want to change this attribute. The change will be reflected in the stored template in your working database.


Displays the value to which you want to change this attribute. The change will be reflected in the stored template in your working database.


Displays the value to which you want to change this attribute. The change will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Displays the current system security value of this attribute that is used during security analysis.


Select to enable this attribute. The change will be reflected in the stored template in your working database.


Select to disable this attribute. The change will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Displays the current system security value of this attribute used during security analysis.


Select to enable auditing when this event is successful. The change will be reflected in the stored template in your working database.


Select to enable auditing when this event is not successful. The change will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Click to keep the current security settings on the system.


Click to modify the current system security settings to the stored template settings in your working database (your recommended settings).


Click to view the current system security settings before confirming this selection.


Click to view or modify the stored template security settings before confirming this selection.


Click to immediately apply your selection to the system.


Displays the list of registry keys.


Displays the registry key you have selected from the list.


Select to enable auditing when this event is successful. The change will be reflected in the stored template in your working database.


Select to enable auditing when this event is not successful. The change will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Select to enable this attribute in the stored template in your working database.


Select to disable this attribute in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


The value to which you want to change this attribute in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Select the security template you want to save.


The current security setting value for the system, used during analysis.


The settings for the system log which determine how often the log is overwritten. The setting will be reflected in the stored template in your working database.


Select to overwrite the log events after a specified number of days. The setting will be reflected in the stored template in your working database.


Select to overwrite the log events only when there is no available disk space to append new entries. The setting will be reflected in the stored template in your working database.


Select if you never want to overwrite the system log events and always append entries. You must clean out the log manually when it grows too large for available disk space. The setting will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Displays the settings for the system log which determine how often the log is overwritten. The setting will be reflected in the stored template in your working database.


Select to overwrite the log events after a specified number of days. The setting will be reflected in the stored template in your working database.


Select to overwrite the log events only when there is no further available disk space to append new entries. The setting will be reflected in the stored template in your working database.


Select if you never want to overwrite the system log events and always append entries. You will have to manually clean out the log when it grows too large for available disk space. The setting will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Assigned to dis plays the list of security attributes, Analyzed Setting displays their current value, and Configuration Setting displays the value stored in the template in your working database.


Click to add to Assigned to (the list of security attributes), Analyzed Setting (their current value), and Configuration Setting (the value stored in the template in your working database).


Specifies whether to include this security setting in your Group Policy object or security template.


The current security setting value for the system. This is used during analysis.


Click to view the current security settings for this service.


Select a startup mode for this service. The setting will be reflected in the stored template in your working database.


Click to have this service start automatically at system start time. The setting will be reflected in the stored template in your working database.


Click if you do not want this service to start until you manually start the service. The setting will be reflected in the stored template in your working database.


Click if you want this service to be disabled so it cannot be started. The setting will be reflected in the stored template in your working database.


Click to edit the security settings for this service. The setting will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Select a startup mode for this service. The setting will be reflected in the stored template in your working database.


Click to have this service start automatically at system start time. The setting will be reflected in the stored template in your working database.


Click if you do not want this service to start until you manually start the service. The setting will be reflected in the stored template in your working database.


Click if you want this service to be disabled so it cannot be started. The setting will be reflected in the stored template in your working database.


Click to edit the security settings for this service. The setting will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Click to apply security to this object, and be inherited by any child objects when child objects do not currently have security settings configured. The setting will be reflected in the stored template in your working database.


Click to apply security to this object, and be inherited by any child objects even if child object security is currently configured. The setting will be reflected in the stored template in your working database.


Click to ignore (or exclude) security for this object and any child objects, when you perform security analysis or configuration.


Click to edit security for this object. The setting will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


The attribute on which security analysis has been performed.


Click to view the current security settings used during analysis.


Click to apply security to this object, and be inherited by any child objects when child objects do not currently have security settings configured. The setting will be reflected in the stored template in your working database.


Click to apply security to this object, and be inherited by any child objects even if child object security is currently configured. The setting will be reflected in the stored template in your working database.


Click to ignore (exclude) security for this object and any child objects, when you perform security analysis or configuration.


Click to edit security for this object. The setting will be reflected in the stored template in your working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Indicates the progression of the security analysis.


Account Policies security settings are currently being  analyzed or if a check mark appears, analysis on this security area is complete.


Local Policies security settings are currently being  analyzed or if a check mark appears, analysis on this security area is complete.


Restricted Group are currently being analyzed or if a check mark appears, analysis on this security area is complete.


Registry keys are currently being analyzed or, if a check mark appears, analysis on this security area is complete.


File system is currently being analyzed or. if a check mark appears, analysis on this security area is complete.


System services are currently being analyzed or, if a check mark appears, analysis on this security area is complete.


Indicates the progression of the security analysis.


Indicates the path to where the error log for this process should be saved.


Click to select the path to where the error log for this process should be saved.


Displays the list of current accounts (Members), the proposed or recommended setting (Template Setting), and the current setting (Analyzed Setting).


Displays the list of current accounts (Members), the proposed or recommended setting (Template Setting), and the current setting (Analyzed Setting).


Click to add an account to the list of current accounts. The change will be reflected in the stored template in your working database.


Displays the path to where the error log for this process should be saved.


Click to select the path to where the error log for this process should be saved.


Displays the path to where the error log for this process should be saved.


Click to select the path to where the error log for this process should be saved.


Select this check box to overwrite the any stored templates in the working database with the imported template. When this check box is cleared, the imported template will be merged with the stored templates, forming a composite template in the working database.


Displays the description of the security template. This can be used to uniquely define why and for what types of systems this template was created.


Displays the version of the Security Configuration and Analysis snap-in.


Displays the path to where the error log for this process should be saved.


Select this check box to overwrite any stored templates in the working database with the imported template. When this checkbox is cleared, the imported template will be merged with the stored templates, forming a composite template in the working database.


Displays the name of the security template. A unique name will help quickly identify for what types of systems the template was created.


Displays the description of the security template. This can be used to uniquely define why and for what types of systems this template was created.


Displays the security setting value currently enforced on the system.


Select to enable auditing when this event is successful. This change will be reflected in the local policy.


Select to enable auditing when this event is not successful. This change will be reflected in the local policy.


Specifies whether to include this security setting in your local policy security configuration.


Displays the security setting value currently enforced on the system.


Select to enable this security setting on the system. The change will be reflected in the local policy.


Select to disable this security setting on the system. The change will be reflected in the local policy.


Specifies whether to include this security setting in your local policy security configuration.


Displays the security setting value currently enforced on the system.


Use to configure a new security value for this attribute. The change will be reflected in local policy.


Specifies whether to include this security setting in your local policy security configuration.


Select to overwrite the log events after a specified number of days. The change will be reflected in local policy.


Select to overwrite the log events only when there is no space to append new entries (no further available disk space). The change will be reflected in local policy.


Select to never overwrite the system log events and always append entries. You will have to manually clean out the log when it grows too large for available disk space. The change will be reflected in local policy.


Specifies whether to include this security setting in your local policy security configuration.


Displays the value currently enforced on the system.


Configure a new value for this security attribute. The change will be reflected in the local policy.


Specifies whether to include this security setting in your local policy security configuration.


In Assigned to, displays the list of security attributes. In Local Policy, displays the local policy value for that attribute, and in Effective policy, displays the security attribute value currently enforced on the system.


Click to add to the list of security attributes (displayed in Assigned to).


Specifies whether to include this security setting in your local policy security configuration.


Displays the security setting currently enforced on the system


Displays the new security setting value. The change will be reflected in the local policy.


Specifies whether to include this security setting in your local policy security configuration.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Specifies whether to include this security setting in your Group Policy object or security template.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Specifies whether to include this security setting in your Group Policy object or security template.


You configured security attributes which were dependent on other security settings. Review the list of suggested values and reconfigure the attributes.


You configured security attributes which were dependent on other security settings. Review the list of suggested values and reconfigure the attributes.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the current security setting value for the system, used during analysis.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the list of registry keys.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Select the security template you want to save.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the list of security attributes in Assigned to, their current value in Analyzed Setting, and the value stored in the template in your working database in Configuration Setting.


The proposed (template) setting for this security attribute.


Displays the current security setting value for the system, used during analysis.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the current security setting value for the system, used during analysis.


Use to configure a path to where the error log for this process should be saved.


Displays the description of the security template. This can be used to uniquely define why and for what types of systems this template was created.


Displays the name of the security template. A unique name will help quickly identify for what types of systems the template was created.


Displays the description of the security template. This can be used to uniquely define why and for what types of systems this template was created.


Displays the current security setting value for the system, used during analysis.


Displays the value to which you want to change this attribute. The change will be reflected in the stored template in your working database.


Displays the current security setting value for the system, used during analysis.


Displays the security setting value currently enforced on the system.


Displays the value to which you want to change this security setting. This change will be reflected in the local policy.


Displays the security setting value currently enforced on the system.


Displays the value to which you want to change this security setting. This change will be reflected in the local policy.


Displays the security setting value currently enforced on the system.


Displays the security setting value currently enforced on the system.


Displays the value to which you want to change this attribute. The change will be reflected in local policy.


Use to configure a new security value for this attribute. The change will be reflected in local policy.


Use to configure the number of times you can attempt to log on and fail before the account is locked out. The change will be reflected in local policy.


Displays the security setting value currently enforced on the system.


Displays the system security value currently enforced on the system.


Displays the value to which you want to change this attribute. The change will be reflected in the local policy.


Displays the security setting value currently enforced on the system.


Displays the value to which you want to change this attribute. The change will be reflected in the local policy.


Displays the list of security attributes in Assigned to, the local policy value for that attribute in Local Policy, and the security attribute value currently enforced on the system in Effective policy.


Displays the list of security attributes in Assigned to, the local policy value for that attribute in Local Policy, and the security attribute value currently enforced on the system in Effective policy.


Displays the security setting value currently enforced on the system.


Displays the value to which you want to change this attribute. The change will be reflected in the local policy.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the current security setting value for the system, used during analysis.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Use to configure a new security value for this attribute. The change will be reflected in the stored template in the working database.


Displays the registry key you have selected from the list.


Use to configure a new security value for this attribute. The change will be reflected in the local policy.